Opium

Opium was released in 1977.

This fragrance was created by Jean Amic and Jean-Louis Sieuzac.

Bottle size – 50ml.

Top notes: Mandarin Orange, Bergamot, Jasmine.
Middle notes: Carnation, Myrrh, Opoponax.
Base notes: Amber, Patchouli, Sandalwood.