Kirke

Kirke was released in 2015.

This fragrance was created by Paolo Terenzi.

Bottle size – 50ml.

Top notes: Passionfruit, Peach, Pear.
Middle notes: Lily of the Valley.
Base notes: Vanilla, Musk, Patchouli.