Etoile Filante

Étoile Filante was released in 2021.

This fragrance was created by Jacques Cavallier-Belletrud.

Bottle size – 50ml.

Top notes: Strawberry, Osmanthus.
Middle notes: Jasmine, Magnolia.
Base notes: White Musk.