Mukhalat

Mukhalat was released in 2008.

This fragrance was created by Pierre Montale.

Bottle size – 50ml.

Top notes: Strawberry, Almond.
Middle notes: Vanilla, Peruvian Balsam.
Base notes: White Musk, Amber, Sandalwood.