Mon Paris

Mon Paris was released in 2016.

This fragrance was created by Olivier Cresp, Harry Fremont, and Daphne Bugey.

Bottle size – 50ml.

Top notes: Strawberry, Raspberry, Pear.
Middle notes: Jasmine, Orange Blossom, Datura.
Base notes: Patchouli, Musk, Ambroxan.