Paris

Paris was released in 1983.

This fragrance was created by Sophia Grojsman.

Bottle size – 50ml.

Top notes: Strawberry, Orange Blossom, Violet.
Middle notes: Rose, Jasmine, Lily of the Valley.
Base notes: Amber, Sandalwood, Musk.